en	The submitted API key is valid and can be used for the following domain(s): %s

en	The submitted API key is invalid, please check your input!

en	The beginning of the website could not be determined! Maybe you forgot to activate the option "Use as start of website" in the page properties of the start page.

en	No avalex configuration found. Please create an avalex configuration record with api key on page 0 (topmost page with TYPO3 logo).