en	Name

en	City name

en	Country

en	API-Key

en	Clear cache for pages (comma separated list with IDs)

en	TYPO3 Mail configuration

en	Notify via mail if task was not successful

en	Mail notification sender name

en	Mail notification sender E-Mail

en	Record storage page (optional)

en	default:

en	default:

en	Select

en	click on the button and select a page

en	Mail notification receiver E-Mail

en	You can change the mail configuration via the TYPO3 Install Tool > All configuration > Mail.

en	API request successfully. API will use measure data from %s, %s.

en	API returns code 404, please check the city name!

en	API returns no status code. Return value of API-request was %s

en	API request failed. Please check your internet connection and try again later!

en	Got Error 401 while API request. Please check your API-Key.