en	Fetch alerts for selected cities

en	Selected regions

en	click on the button and select a page

en	Record storage page (optional)

en	Clear cache for pages (comma separated list with IDs)

en	Select

en	API request failed. The server could not get a response from Deutscher Wetterdienst.

en	No DWD warn cell records found in your TYPO3 installation. You can create your own at root path or via the scheduler task 'Get warn cell records from Deutscher Wetterdienst'. Take a look into the documentation for more information.